;
; Definition file of HAL.dll
; Automatic generated by gendef
; written by Kai Tietz 2008
;
LIBRARY "HAL.dll"
EXPORTS
HalAcquireDisplayOwnership
HalAdjustResourceList
HalAllProcessorsStarted
HalAllocateAdapterChannel
HalAllocateCommonBuffer
HalAllocateCrashDumpRegisters
HalAssignSlotResources
HalCalibratePerformanceCounter
HalCallBios
HalClearSoftwareInterrupt
HalDisableSystemInterrupt
HalDisplayString
HalEnableSystemInterrupt
HalFlushCommonBuffer
HalFreeCommonBuffer
HalGetAdapter
HalGetBusData
HalGetBusDataByOffset
HalGetEnvironmentVariable
HalGetInterruptVector
HalHandleMcheck
HalHandleNMI
HalInitSystem
HalInitializeProcessor
HalIsHyperThreadingEnabled
HalMakeBeep
HalProcessorIdle
HalQueryDisplayParameters
HalQueryRealTimeClock
HalReadDmaCounter
HalReportResourceUsage
HalRequestIpi
HalRequestSoftwareInterrupt
HalReturnToFirmware
HalSendNMI
HalSendSoftwareInterrupt
HalSetBusData
HalSetBusDataByOffset
HalSetDisplayParameters
HalSetEnvironmentVariable
HalSetProfileInterval
HalSetRealTimeClock
HalSetTimeIncrement
HalStartNextProcessor
HalStartProfileInterrupt
HalStopProfileInterrupt
HalSystemVectorDispatchEntry
HalTranslateBusAddress
IoAssignDriveLetters
IoFlushAdapterBuffers
IoFreeAdapterChannel
IoFreeMapRegisters
IoMapTransfer
IoReadPartitionTable
IoSetPartitionInformation
IoWritePartitionTable
KdComPortInUse DATA
KeFlushWriteBuffer
KeQueryPerformanceCounter
KeStallExecutionProcessor
x86BiosExecuteInterrupt
x86BiosInitializeBiosEx
x86BiosTranslateAddress
